FBHFû█l┌'P
 ASTRA help system ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  No help available in this context.
'ª
 ASTRA ▄
  ▀▀▀▀▀▀
  This program performs computer configuration analysis and provides
  detailed information on your computer  hardware  and  its  working
  modes.
'
 Multitask ▄
  ▀▀▀▀▀▀▀▀▀▀
  Program runs in a DOS-window under Windows 9x/Me. Due to  the  use
  of the external Win32 module,  program running in a DOS-window  is
  absolutely identical to the program operation in pure DOS.  Before
  starting  the  program  in  multitask  OS,    please  close    all
  applications and make sure that no programs are using disk  drives
  and sound card otherwise identification of these  devices  can  be
  incorrect.  Attention: after starting the program all data in  the
  Windows clipboard will be lost.  The program can't  be  run  in  a
  DOS-window under Windows 3.x, Windows NT/2000/XP and OS/2.  Please
  use ASTRA32 for Windows NT4/2000/XP/Server 2003/95/98/ME.   Please
  visit http://www.astra32.com  to  learn  more  about  ASTRA32  for
  Windows.
'3
 Information ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀
  Program main menu
7
    System Summary
    DMI System Info
    DMI Motherboard Info
    CPU Info
    BIOS Info
    PCI Info
    SPD Memory Info
    DMI Memory Info
    IDE (ATA/ATAPI) Info
    SCSI Devices Info
    PnP Info
    DMI/SMBIOS Info
    DMI Slots Info
    DMI Ports Info
    Drives Info
    Monitor Info
    Video Info

    Exit to DOS

9L`
yå	öí╡╔Γ°#$%,&?'O(`
)p'2Å
 System Summary ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Processor: Vendor  and name  of the processor  and  also  original
  (not-overclocked) processor clock.
╧
  Coprocessor: Vendor and name of the numeric coprocessor.  In 486DX
  and higher coprocessor and processor are using  the  same  crystal
  (except NexGen Nx586/686); coprocessor is identified as Internal.
J
  CPU Clock: Processor frequency.  For Pentium processors  frequency
  is  defined  with  the  RDTSC  command  reading  TSC  (Time  Stamp
  Counter).  Frequency accuracy reaches 0.1 MHz with any  CPU  usage
  (important in  multitask  OS).    For  486  and  lower  processors
  frequency is defined by its speed.  In this case  program  results
  under Windows can be incorrect.  For Intel Pentium Pro and higher,
  AMD K6-2 and higher,  VIA Cyrix III and higher,  IDT WinChip2  and
  higher processors there can be identified clock multiplier,    FSB
  clock and bus type (DDR, QDR).
ε
  Level  1  Cache:  L1  cache  size  (cache  for  keeping  data  and
  instruction).  Is identified for Intel  processors  of  the  sixth
  generation and higher, AMD K5 PR120 and higher,  VIA Cyrix III and
  higher, Centaur processors.
╔
  Level 2 Cache: L2  cache  size. L2  cache  is  integrated  in  the
  processor  and  identified  for  Intel  processors  of  the  sixth
  generation, AMD K6-2+ and higher, VIA Cyrix III and higher.
:
  Level 3 Cache: L3 cache size of Intel Xeon processors.
Q
  System Name: Can be identified  on  motherboards  with  DMI/SMBIOS
  support.
u
  Motherboard  OEM:  Motherboard  vendor. In  some  cases  the  name
  written on the box doesn't  coincide  with  this  line.    Classic
  example is Acorp.  The company doesn't possess its own  production
  facilities and places orders at Hope Vision, SuperPower, San Li or
  Agama Technology Co. Ltd plants. Can be identified on motherboards
  with AWARD and AMI BIOS.
Q
  Board Model: Can be identified  on  motherboards  with  DMI/SMBIOS
  support.
*
  BIOS Version: BIOS vendor and version.
╫
  Chipset Vendor: Mainboard chipset vendor.  Chipset is a  group  of
  microchip designed to work and sold as a unit in performing one or
  more related functions. Is identified only in systems with the PCI
  bus.
_
  Chipset: Name of chipset.  Is identified only in systems with  the
  PCI bus or AWARD BIOS.
4
  PCI Bus Version: If not installed - Not Present.
5
  PnP BIOS Version: If not installed - Not Present.
Q
  DMI/SMBIOS Vers.: DMI/SMBIOS version.   If  not  installed  -  Not
  Present.
G
  Monitor Vendor: Can be identified only for relatively new monitors.
~
  Monitor Model: Some monitors don't support this function.  In this
  case the program will type 'Old Style Monitor/Cable'.
Ü
  Base Memory: Base memory size.  Base memory is the first 640 Kb of
  memory running in real mode.  There can be  identified  free  base
  memory size.
m
  Extended Memory: Extended memory size.  Extended memory is all  of
  the memory above the first megabyte.
.
  System Memory: Total size of system meory.
\
  Memory Module: Information on each memory module  (size,    speed,
  type, manufacturer)
0
  HDD Model: IDE or SCSI HDD vendor and model.
j
  HDD Size: HDD size.  If IDE or SCSI drives are not  installed  the
  HDD size is identified from BIOS.
k
  CD/DVD Model: ATAPI or  SCSI  devices  vendor  and  model  (CD/DVD
  devices, ZIP, magnetooptics, etc).
Ç
  CD/DVD Speed: Maximum read speed of ATAPI device.   Maximum  write
  speed supported by the device is indicated in brackets.
B
  Video Chip Vendor: Is identified only for PCI/AGP video cards.
q
  Video  Chip:  Main  microchip  of  the  graphic  controller.    Is
  identified only for PCI/AGP video cards.
ú
  VESA OEM String: Video BIOS ID identified by any video  card  with
  VESA-support.  If VESA is not  supported,    the  program  detects
  EGA/VGA adapter type.
⌐
  Video Memory: Video memory size returned by  VESA  BIOS  function.
  Some graphics accelerators return not total video memory size  but
  size identified in 2D mode.
@
  Sound Chip Vendor: Is identified only for PnP and PCI cards.
O
  Sound Chip: Sound chip model.  Is identified only for PnP and  PCI
  cards.
W
  Sound Card Type:  Compatibility  of  the  sound  card  with  Sound
  Blaster cards.
T
  DSP Version: Version of the DSP digital processor installed on the
  sound card.
─
  Base Port,  IRQ,  8bit DMA,  16bit DMA: Sound card  configuration:
  base port number, IRQ channel number, 8bit DMA channel number. For
  SB16 and higher - identifies 16bit DMA channel number.
û
  Floppy Drives: Identifies alphabetic index of  the  floppy  drive,
  its capacity and physical size of the floppy  disk  (5.25  or  3.5
  inches).
<
  Printer Vendor: Is identified only for LPT/PnP printers.
;
  Printer Model: Is identified only for LPT/PnP printers.
═
  DOS Version: Version and vendor of DOS. Identifies OS location  in
  the memory (in HMA - if DOS is located in high memory area).    MS
  DOS 7.0 and higher is available together with MS Windows 9x/Me.
å
  Multitask OS: Name of the multitask OS under which the program was
  launched. In brackets the program indicates build of your OS.
4
  Windows Folder: Folder where Windows is located.
@
  Modem Vendor: Is determined only for ISA/PnP and PCI modems.
?
  Modem Model: Is determined only for ISA/PnP and PCI modems.
O
  Network Vendor: Is determined only for  ISA/PnP  and  PCI  network
  cards.
W
  Network Card: Network card model.  Is determined only for  ISA/PnP
  and PCI cards.
E
  MAC Address: Network card MAC address. NetBIOS installed require.

  Network Name: Computer network name.  This  feature  is  available
  only if your computer network name has been specified.

  Mouse Type: Possible values: Bus, Serial, InPort, PS/2, HP. If you
  don't have PS/2 mouse,  there will  be  identified  COM-port  with
  installed mouse.  If a mouse driver  is  not  installed  or  mouse
  itself is absent, the program will display a message 'Not Found'.
w
  LPT Ports: Number of parallel ports on the computer.  In  brackets
  the program indicates number of used I/O port.
s
  COM Ports: Number of serial ports on the computer. In brackets the
  program indicates number of used I/O port.
<
  Joystick: Checks if joystick is installed on the system.
'8
 DMI System Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  System Vendor:
&
  Product Name: System product name.

  Version: System version.
(
  Serial Number: System serial number.
%
  UUID: Universal Unique ID number.
L
  Wake-up Type: Identifies the event that caused the system to power
  up.

  Structure Length:
5
                   System Enclosure or Chassis Info
0
  Manufacturer: System enclosure manufacturer.
 
  Type: System enclosure type.
&
  Version: System enclosure version.
2
  Serial Number: System enclosure serial number.

  Asset Tag:
U
  Boot-up State: Identifies the state of the enclosure when  it  was
  last booted.
o
  Power Supply St.: Identifies the state of  the  enclosure's  power
  supply (or supplies) when last booted.
P
  Thermal State: Identifies the enclosure's thermal state when  last
  booted.
a
  Security Status:  Identifies  the  enclosure's  physical  security
  status when last booted.
C
  OEM-defined: Contains OEM- or BIOS vendor-specific information.
(
  Height: The height of the enclosure.
b
  Power Cords: Identifies the number of power cords associated  with
  the enclosure or chassis.
B
  Contained Element: Identifies the number of Contained Element.

  Structure Length:
'
U
 DMI Motherboard Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Board Vendor: Motherboard vendor.
$
  Product Name: Motherboard model.
!
  Version: Motherboard version.
-
  Serial Number: Motherboard serial number.

  Structure Length:
/
                         On Board Device Info
$
  Description: Device description.

  Device Type:
-
  Status: Device status - enabled/disabled.
y
  System Configuration Options.  Contains  information  required  to
  configure the base board's Jumpers and Switches.
'-
 CPU Info ▄
  ▀▀▀▀▀▀▀▀▀
  CPU Info submenu.
A
    CPU Info
    DMI CPU Info
    Cache Info
    DMI Cache Info
3@Q
`'â
 CPU Info ▄
  ▀▀▀▀▀▀▀▀▀
  Processor: Vendor  and name  of the processor  and  also  original
  (not-overclocked) processor clock.
╧
  Coprocessor: Vendor and name of the numeric coprocessor.  In 486DX
  and higher coprocessor and processor are using  the  same  crystal
  (except NexGen Nx586/686); coprocessor is identified as Internal.
|
  CPU Clock: Processor frequency. For Pentium  processors  frequency
  is  defined  with  the  RDTSC  command  reading  TSC  (Time  Stamp
  Counter).  Frequency accuracy reaches 0.1 MHz with any  CPU  usage
  (important in  multitask  OS).    For  486  and  lower  processors
  frequency is defined by its speed.  In this case  program  results
  under Windows can be incorrect.
X
  Frequency Range: Frequency range on which processors  of the given
  type were made.
ε
  Level  1  Cache:  L1  cache  size  (cache  for  keeping  data  and
  instruction).  Is identified for Intel  processors  of  the  sixth
  generation and higher, AMD K5 PR120 and higher,  VIA Cyrix III and
  higher, Centaur processors.
╔
  Level 2 Cache: L2  cache  size. L2  cache  is  integrated  in  the
  processor  and  identified  for  Intel  processors  of  the  sixth
  generation, AMD K6-2+ and higher, VIA Cyrix III and higher.
:
  Level 3 Cache: L3 cache size of Intel Xeon processors.
/
  System Bus Clk: Processor system bus clock.
╠
  FSB Clock: Processor FSB clock and bus  type  (DDR,    QDR).    Is
  determined for Intel Pentium Pro processors and higher,  AMD  K6-2
  and higher, VIA Cyrix III and higher, IDT WinChip2 and higher.
╢
  Multiplier: Processor clock multiplier.  Is determined  for  Intel
  Pentium Pro processors and higher, AMD K6-2 and higher,  VIA Cyrix
  III and higher, IDT WinChip2 and higher.
╢
  Original Clock: Original (not-overclocked) processor  clock.    It
  allows to identify  the processor  overclocked. Is  available  for
  Intel Pentium Pro processors and higher.

  Platform ID: Socket (slot, socket) and package processor type.  Is
  determined for Intel Pentium II processors and higher.
┘
  Vendor: Identification of the processor's vendor
    'GenuineIntel' - for Intel company;
    'AuthenticAMD' - for AMD company;
    'UMC UMC UMC ' - for UMC company;
    'CyrixInstead' - for Cyrix company;
    'NexGenDriven' - for NexGen company;
    'CentaurHauls' - for Centaur/IDT company;
    'RiseRiseRise' - for Rise company;
    'GenuineTMx86' - for Transmeta company;
    'Geode by NSC' - for National Semiconductor company;
    'SiS SiS SiS ' - for SiS company.
,
  Processor Name: Internal processor name.
╣
  Processor Type: Identifies single,  dual processors and  overdrive
  processors.  The  program  will  type  'Original  OEM  Processor',
  'OverDrive Processor' and 'Dual Processor'.
▄
  Family,  Model,  Stepping: Information  identified  by  the  CPUID
  instruction. Family is processor generation (for Intel processors:
  4 - 486, 5 - Pentium,  6 - Pentium Pro and processors based on the
  it core).
6
  CPU Signature: Processor 8-byte verification code.
#
  BrandID: Identifies Celeron,  Pentium  III,    Pentium  III  Xeon,
  Pentium III-S, Pentium III-M, Celeron Mobile,  Pentium 4,  Pentium
  4-M,  Xeon,  Xeon MP,   AMD  Opteron  and  Athlon  64  processors.
  Available on Intel processors based on the 0.18-micron  Coppermine
  technology.
R
  Logical CPU Cnt: Count of logical processors of  Hyper-Threading
  technology.
v
  Max (Ext)CPUID Level: Values returned  by  the  CPUID  instruction
  with arguments 0 and 80000000h, respectively.
º
  Serial Number: Processor Serial Number. Available on Intel Pentium
  III and Intel Pentium II Mobile processors. The serial number mast
  be enabled in BIOS Setup.

  Alias Name: Processor alias  name  before  its  official  release.
  Production technology can be named  in  brackets, too.
Y
  Core Stepping: Core stepping  to  identify  processor  errors  and
  frequency rates.
?
  MSR XXh: Contents appropriate MSR (Model Specific Register)
k
  Instruction Set: List of additional command set.
    - Floating-Point Unit on-Chip
    - IA MMX Technology
    - Streaming SIMD Extensions (SSE)
    - Streaming SIMD Ext. - 2 (SSE-2)
    - Streaming SIMD Ext. - 3 (SSE-3)
    - Intel Architecture - 64 (IA-64)
    - AMD MMX Instruction Extensions
    - AMD 3DNow! Instructions
    - AMD 3DNow! Extensions
    - AMD x86-64 Long Mode
    - Cyrix Extended MMX
    - CMPXCHG8 Instruction Supported
    - Fast System Call
    - Conditional Move Instruction
    - CLFLUSH Instruction
    - Fast Save and Restore
    - Monitor/MWAIT
    - AMD SYSCALL and SYSRET Instruction
<
  Processor Features: List of processor  features  returned  by  the
  CPUID instruction.
    - Virtual Mode Extension
    - Debugging Extension
    - Page Size Extension
    - Time Stamp Counter
    - Model Specific Registers
    - Physical Address Extension (over 32 bit)
    - Machine-Check Exception
    - On-chip APIC Hardware Supported - built-in local APIC (must be
      enabled in BIOS)
    - Memory Type Range Registers
    - Page Global Enable
    - Machine-Check Architecture
    - Page Attribute Table
    - 36-bit Page Size Extension
    - Processor Serial Number
    - Debug Store
    - Self-Snoop
    - Hyper-Threading Technology
    - Signal Break on FERR
    - CPL-Qualified Debug Stor
    - Context ID
    - AMD Model-Specific Registers
    - AMD Multiprocessing Capable
    - AMD No-execute Page Protection
3
  Power Management:
    - ACPI Support
    - Thermal Monitor Supported
    - Termal Monitor 2
    - Enhanced SpeedStep Technology
    - AMD Temperature Sensor
    - AMD Frequency ID Control
    - AMD Voltage ID Control
    - AMD Thermal Trip
    - AMD Thermal Monitoring
    - AMD Software Thermal Control
│
  If your processor doesn't support CPUID,    this  window  will  be
  closed after showing  the  first  three  items  and  displaying  a
  message 'CPUID Command: Not Present'.
'W
 DMI CPU Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀
  Information on the CPU's installed on the computer.

  Processor Vendor:
'
  Processor Version: Processor model.
%
  Current Speed: Current CPU speed.
-
  External Clock: External clock frequency.

  Voltage: CPU core voltage.
<
  Processor Upgrade: Socket (slot, socket) processor type.
4
  Processor Status: CPU status - enabled/disabled.
.
  Socket Designation: Reference designation.

  Processor Type:

  Processor Family:
5
  Processor ID1: Raw processor identification data.
4
  Processor ID2: Raw processor identification data
P
  Max Speed: Maximum internal processor speed,  as supported by  the
  system.
(
  Socket Status: CPU socket populated.
%
  Serial Number: CPU serial number.

  Asset Tag:
!
  Part Number: CPU part number.

  Structure Length:
'┴
 Cache Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀
  The window is available only for Intel  processors  of  the  sixth
  generation and higher,  AMD PR120 and higher,  VIA Cyrix  III  and
  higher and some others.
º
                            Level 1 Cache
  Sub-items Instruction & Data Cache consist of Size, Associativity,
  Lines per Tag (except Intel processors), Lines Size.
x
  Sub-items 4-Kbyte and 4-MByte Instruction & Data  TLB  Information
  consist of Number of Entries and Associativity.
ï
                            Level 2 Cache
  Sub-items Size,  Associativity,    Lines  per  Tag  (except  Intel
  processors), Lines Size.
ß
  For AMD Athlon/Duron processors: sub-items  L2  Data  TLB  and  L2
  Unified TLB consist of  4-Kbyte  and  4-MByte  Pages  and  L2  TLB
  Information.  They all are characterized by Number of Entries  and
  Associativity.
î
                            Level 3 Cache
  Sub-items Size, Associativity, Lines Size. Available on Intel Xeon,
  Pentium 4 EE processors.
'P
 DMI Cache Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Information about L1/L2/L3 cache levels.

  Cache Level:
)
  Installed Size: Installed cache size.

  Operational Mode:

  Current SRAM Type:
,
  Status: Cache status - enabled/disabled.
.
  Socket Designation: Reference designation.

  Cache Socketed:
G
  Location: Location, relative to the CPU module - internal/external.
A
  Maximum Cache Size: Maximum cache size that can be installed.

  Supported SRAM:
4
  Cache Speed: Cache module speed, in nanoseconds.
S
  Error Correction: Error-correction scheme supported by this  cache
  component.
Q
  System Cache Type: Logical type of cache - instruction  /  data  /
  unified.
.
  Associativity: Associativity of the cache.

  Structure Length:
'0
 BIOS Info ▄
  ▀▀▀▀▀▀▀▀▀▀
  BIOS Info submenu.
!
    BIOS Info
    DMI BIOS Info
6	D
'R
 BIOS Info ▄
  ▀▀▀▀▀▀▀▀▀▀
  Motherboard  OEM:  Motherboard  vendor. In  some  cases  the  name
  written on the box doesn't  coincide  with  this  line.    Classic
  example is Acorp.  The company doesn't possess its own  production
  facilities and places orders at Hope Vision, SuperPower, San Li or
  Agama Technology Co. Ltd plants.
[
  OEM URL: Web-address of the motherboard vendor where BIOS  upgrade
  can be downloaded.
*
  BIOS Version: BIOS vendor and version.
ä
  BIOS Model, Submodel,  Revision: Needed only in old BIOS versions.
  It is installed as FCh/01h/00h in all modern BIOS versions.
Ç
  BIOS Date:  Date  of  issue  of  the  current  BIOS.    Identifies
  motherboard release date (if BIOS hasn't been updated).
U
  AWARD Copyright: Information on the vendor's copyright  (only  for
  AWARD BIOS).
n
  Motherboard ID:  Motherboard  ID  displayed  during  the  computer
  start-up (only for AWARD ¿ AMI BIOS).
[
  BIOS ID: BIOS ID displayed during the computer start-up (only  for
  AWARD ¿ AMI BIOS).
/
  BIOS Type: BIOS type (only for AWARD BIOS).
G
  Bus Type: System bus type of the motherboard (only for AWARD BIOS).
>
  Processor: Processor family (only for AWARD and AMI BIOS).
C
  Chipset: Name of the motherboard chipset (only for AWARD BIOS).
9
  Chipset ID: Chipset ID (only for AWARD and AMI BIOS).
O
  BIOS Revision: Number of the BIOS version (only for AWARD and  AMI
  BIOS).
B
  BIOS Size: Microchip size containing BIOS (only for AMI BIOS).
;
  Advanced Power Management Version: In  Energy  Star  BIOS's  there
  will be identified APM version and supported features:
    - 16-bit PM Interface Support
    - 32-bit PM Interface Support
    - CPU Idle Call Reduces Processor Speed
    - BIOS Power Management Disabled
    - BIOS Power Management Disengaged
'2
 DMI BIOS Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  BIOS Vendor:

  BIOS Version:
!
  BIOS Date: BIOS release date.
C
  BIOS ROM Size: Size of the physical device containing the BIOS.
@
  Starting Segment: Segment location of BIOS starting address.
3
  Current Language: Currently installed language.
3
  Number of Lang.: Number of languages available.

  Structure Length:
°
  Bus Supported: System buses, which supported by BIOS.
    - PCI is Supported
    - AGP is Supported
    - USB is Supported
    - ISA is Supported
    - VLBus is Supported
    - MCA is Supported
    - EISA is Supported
    - PC Card is Supported

  Boot Options: Boot options, which supported by BIOS.
    - Selectable Boot
    - Boot From CD
    - ATAPI ZIP Drive Boot
    - LS-120 Boot
    - BIOS Boot Specification
    - Boot From PC Card
    - Network Service Boot supported
    - I2O Boot
    - 1394 Boot
«
  BIOS Features.
    - BIOS Characteristics
    - ACPI Supported
    - PnP is Supported
    - APM is Supported
    - ESCD Support
    - Enhanced Disk Drive (EDD)
    - BIOS is Upgradeable (Flash)
    - BIOS ROM is Socketed
    - BIOS Shadowing is Allowed
    - Smart Battery Supported
    - Int 13h - 5.25"/360kB Floppy
    - Int 13h - 5.25"/1.2MB Floppy
    - Int 13h - 3.5"/720kB Floppy
    - Int 13h - 3.5"/2.88MB Floppy
    - Int 5h, Print Screen Service
    - Int 9h, 8042 Keyboard Services
    - Int 14h, Serial Services
    - Int 17h, Printer Services
    - Int 10h, CGA/Mono Video Services
    - Int 13h - Floppy for NEC 9800
    - Int 13h - Floppy for Toshiba
    - NEC PC-98
'L
 PCI Info ▄
  ▀▀▀▀▀▀▀▀▀
  PCI Bus Version: If not installed - Not Present.
Y
  Number of PCI Buses: The number is 1 for single processor  systems
  without AGP bus.
F
  Hereinafter there is the list of devices installed in the PCI bus.
r
  PCI Bus,  Device,  Function: Information on bus  number,    serial
  number of the device and function number.
l
  Vendor: Code and name of the device  vendor. For  example,    code
  8086h belongs to Intel Corporation.
ç
  Device: Code and name of the PCI device. Program can identify many
  devices installed on a PCI bus - from chipsets to video cards.
3
  Subsys Vendor: Unavailable on some PCI devices.
2
  Subsystem ID: Unavailable on some PCI devices.

  Class: Class of the device.
7
  SubClass: Subclass of the PCI device of this class.
%
  Revision: Revision of the vendor.
4
  Interface: Type of the device program interface.
Q
  Memory Access,  I/O Access,  Bus Master: Possible ways  of  device
  running.
B
  Device Timing: Possible values - fast, medium, slow, reserved.
S
  66 MHz Speed Support: Identifies if device supports bus  frequency
  of 66 MHz.
%
  The following items are optional.
-
  SMBus Port: Base port of access to SMBus.
+
  ROM Address: ROM address of the device.
;
  Memory Address: Range of the device's memory addresses.
1
  Base I/O Port: Number of the device I/O port.
0
  System IRQ: Number of the device system IRQ.
8
  Interrupt Pin: Interrupt pin used by the PCI device.
8
  For AGP devices the following 2 items are available.
P
  AGP Capabilities, Version: Version of the AGP bus supported by the
  device.
x
  AGP Speed Supported: Speed of the AGP bus supported by the device.
  'Selected' is the current speed of the AGP bus.
'^
 SPD Memory Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Information on all SPD memory modules in the system.

  See Slot X SPD Info
f'Ω
 Slot X SPD Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Provides information for memory modules with SPD support.  To read
  the information memory module  and  chipset  should  support  SPD.
  Currently the program supports the following chipsets:
Θ
    - with Intel PIIX4 south bridge  (Intel 430TX/440LX/440EX/440BX/
      440ZX/440GX/450NX)
    - Intel 440MX
    - with   Intel   ICH/ICH0/ICH2/ICH2-M/ICH3-S/ICH3-M/ICH4/ICH4-M/
      ICH5/ICH5R/ICH6/6300ESB  hub  (Intel  810/815/820/830/840/845/
      850/860/E7500)
    - with  VIA  596/A/B  south  bridge  (VIA Apollo VP3/Apollo Pro/
      Apollo Pro+/Apollo Pro133/Apollo Pro133A)
    - with VIA 686/A/B  south bridge  (VIA Apollo  MVP4/PM601/KT133/
      KX133/KM133, AMD 751)
    - with  VIA  VT8231/VT8233/VT8233A/VT8233C/VT8235/VT8237   south
      bridge
    - with Reliance OSB4/CSB5/CSB6 south bridge
    - with AMD 755/756/766/768/8111 south bridge
    - with ALI 1533/1543/1535 south bridge
    - nVidia nForce/nForce2/nForce3.
D
  Note: SPD reading is blocked on some Asustek motherboard models.
╦
  Memory Type: Memory module features - size,  speed (PC66,   PC100,
  PC133 for SDRAM; PC1600,  PC2100,  PC2700,  PC3200 for DDR SDRAM),
  memory usage type (SDRAM, DDR SDRAM, DDR SGRAM, DRDRAM, EDO).
½
  Manufacturer:  Memory  module  manufacturer.    If  module  memory
  manufacturer is unknown (memory was made  in  China)  the  program
  will identify it as "Noname".
:
  Module Type: Memory module type (DIMM, RIMM, SO-RIMM).
¥
  Module Attributes: Possible  values:  'Unbuffered',    'Buffered',
  'Registered, Unbuffered', 'Registered,  Buffered'.  Only for SDRAM
  and DDR memory.
╩
  Error Checking: Memory module error  checking.    None  -  absent,
  Parity - parity check,  ECC - error correction (in brackets  error
  correction module discharge). Only for SDRAM and DDR memory.
ε
  CAS# Latency: Time it takes to position the  proper  sector  under
  the read/write head.  In brackets: Cycle  Time  in  nanoseconds  /
  maximum frequency in MHz,  Access Time  -  only  for  SDRAM/DDR  -
  access time in nanoseconds.
+
  CS# Latency: CS# Latency. Only for DDR.
+
  WE# Latency: WE# Latency. Only for DDR.
0
  CLS# Latency: CLS# Latency. Only for DRDRAM.
-
  Refresh Rate: Memory module refresh rate.
(
  Data Width: External bus data width.
A
  SDRAM Width: Memory module organization. Only for SDRAM, DDR.
7
  Voltage Interface: Memory module voltage interface.
G
  Protocol Version: Current RDDRAM protocol version. Only for RDDRAM.
3
  SPD Revision: Number of the using SPD revision.
$
  Part Number: Unique part number.
7
  Manufacturer Date: Memory module manufacturer date.
1
  Serial Number: Unique module's serial number.
6
  Revision Code: Number of the module revision code.
ê
  Note:  Some  characteristics  of  Noname  memory  modules  can  be
  identified as 'None', i.e. corresponding information is absent.
'Ñ
 DMI Memory Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  For motherboard with DMI/SMBIOS support version 2.2 or higher.
  For motherboard with DMI/SMBIOS support version below 2.2.
*>k:'e
 DMI Memory Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Physical Memory Array: Information about memory controller.
=
  Maximum Capacity: Maximum memory capacity for this array.
i
  Location: Physical location of the memory array,  whether  on  the
  system board or an add-in board.
=
  Use: Identifies the function for which the array is used.
o
  Memory Error Corr.: Primary hardware error correction or detection
  method supported by this memory array.
_
  Memory Devices: Number of slots or sockets  available  for  memory
  devices in this array.

  Structure Length:
V
  Describes a single memory device that is part of a larger physical
  memory array.
D
  Size: Size of the memory device. If not installed - Not Present.
C
  Form Factor: Implementation form factor for this memory device.
4
  Memory Type: Type of memory used in this device.
B
  Speed: Identifies the speed of the device, in megahertz (MHz).
à
  Device Locator:  String  that  identifies  the  physically-labeled
  socket or board position where the memory device is located.
ä
  Bank Locator: String number of  the  string  that  identifies  the
  physically labeled bank where the memory device is located.
╬
  Total Width: Total width,   in  bits,    of  this  memory  device,
  including any check or error-correction bits.   If  there  are  no
  error-correction bits, this value should be equal to Data Width.
;
  Data Width: Data width, in bits, of this memory device.
╞
  Device Set: Identifies when the memory device is one of a  set  of
  Memory Devices that must be populated with all devices of the same
  type and size, and the set to which this device belongs.
=
  Type Detail: Additional detail on the memory device type.
-
  Manufacturer: Memory device manufacturer.
/
  Serial Number: Memory device serial number.

  Asset Tag:
+
  Part Number: Memory device part number.

  Structure Length:
'a
 DMI Memory Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Memory Controller: Information about memory controller.
B
  Maximum Capacity: Maximum memory capacity for this controller.
r
  Memory Types: Describes the physical characteristics of the memory
  modules that are supported by the system.
d
  Memory Slots: Number of slots  or  sockets  available  for  memory
  devices in this controller.
D
  Error Correcting: Memory controller error correcting capability.
>
  Error Detecting: Memory controller error detecting method.
x
  En. Error Correct.: Identifies the error  correcting  capabilities
  that were enabled when the structure was built.
3
  Current Interleave: Current interleave support.
,
  Supported Interl.: Supported interleave.
a
  Supported Speeds:  Describes  the  speed  of  the  memory  modules
  supported by the system.
}
  Module Voltage: Describes the required voltages for  each  of  the
  memory module sockets controlled by this controller.

  Structure Length:
[
  Describes a single memory module that is part of a larger physical
  memory controller.
Q
  Installed Size: Size of the memory device.  If not installed - Not
  Present.
4
  Memory Type: Type of memory used in this device.
.
  Socket Designation: Reference designation.
5
  Bank Connections: Memory bank connections (RAS#).
5
  Current Speed: Speed of the memory module, in ns.
n
  Enabled Size: Identifies the amount of  memory  currently  enabled
  for the system's use from the module.
-
  Error Status: Memory module error status.

  Structure Length:
's
 IDE (ATA/ATAPI) Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Information on the ATA/ATAPI devices installed on the computer.
f
  See:
    HDD Info - Information about ATA devices
    ATAPI Info - Information about ATAPI devices
Ç¡
'U
 HDD Info ▄
  ▀▀▀▀▀▀▀▀▀
  HDD Model: HDD vendor and model read from IDE-controller.
∙
  HDD Default Size: Real HDD size read from the IDE-controller.  Due
  to the two different ways of defining 'megabyte'  your  hard  disk
  capacity  can  be  calculated  in  two  different   ways:    after
  calculating   the    number    of    bytes    in    the    formula
  heads*sectors*cylinder*512-bytes-per-sector you may get the result
  in the unit 'megabyte' by dividing either by  1024*1024  (like  in
  the BIOS of the computer does) or by 1000*1000 (like the producers
  of hard disks do).
▒
  HDD Geometry: Heads,  Sectors,  Tracks: Logical number  of  heads,
  sectors per track and tracks while CHS addressing.  It has nothing
  to do with physical HDD parameters.
\
  Compatibility: Compatibility of  this  device  with  the  specific
  ATA/ATAPI standard.
,
  Serial Number: HDD unique serial number.
X
  Controller Revision:  Number  of  the  revision  returned  by  the
  IDE-controller.
╟
  HDD Marketing Size: The marketing size much more than  real  size.
  In  one  'computer'  megabyte  of  1048576  bytes,    but  in  one
  'marketing' (used by HDD manufacturers) of 1000000 bytes.
·
  Buffer Size: Buffer size of the IDE-controller (you shouldn't  mix
  it up with disk cache).  Part of the buffer can be used for system
  purposes, and its real size can be smaller.  Some hard disks don't
  provide information on the buffer size.
∩
  Buffer Type: Internal buffer type of the IDE-controller.  Possible
  values - 'Not specified',  'Single ported single  sector  buffer',
  'Dual ported multi-sector  buffer',    'Dual  ported  multi-sector
  buffer with a read caching'.
*
  ECC bytes: Number of correction bytes.
:
  Security Erase Time: Security Erase Time (in minutes).
1
  Enh. Security Erase: Enhanced Security Erase.
?
  Current APM Value: Current Advanced Power Management Value.
á
  Acoustic Management:  Current  value  of  the  automatic  acoustic
  management (recommended - value recommended by vendor) and  status
  (enabled/disabled)

  PIO Mode Support: PIO (Programmed Input/Output) is a way of moving
  data between device in a computer in  which  all  data  must  pass
  through the processor.  The higher the number is,  the higher  the
  data transfer rate is (For PIO mode 4 - 16.6 MBps).
w
  SW DMA Mode Support: Number of the supported single word DMA mode.
  Active: SW DMA mode currently enabled by BIOS.
|
  MW DMA Mode Support: DMA  (Direct  Memory  Access) is  a  transfer
  protocol where a peripheral device transfers information  directly
  to or from memory,  without the system processor being required to
  perform the transaction. Apart from the previous mode, single word
  DMA modes can be supplanted by multiword DMA modes. Active: MW DMA
  mode currently enabled by BIOS.
V
  UDMA  Mode  Support:  Number  of  the  UltraDMA  mode. Theoretical
  transmission speed for UltraDMA mode 2 is 33 MB/s,  mode 5  -  100
  MB/s.  Some chipsets don't support  UltraDMA  mode  (for  example,
  chipsets i430VX and lower don't support it while  i440BX  supports
  only mode 2). Active: UltraDMA mode currently enabled by BIOS.
£
  Sector per Interrupt: Number of sectors that  can  be  transferred
  per interrupt in a block mode.  Active: Current numbers of sectors
  per interrupt.
²
  HDD Features:
    - DMA Transfer: HDD support of the DMA mode
    - LBA Supported: LBA (Logical Block Addressing) - accesses  made
      through "big" logical blocks of data. Intended to break 504 MB
      barrier so that  BIOS  can  support  disks  larger  than  1024
      cylinders
    - Block Mode: HDD block mode. This  means  that  more  than  one
      sector can be transferred on each  interrupt;    newer  drives
      allow you to transfer as many as 16 or 32 sectors at a time
    - Double Word I/O: Support of DMA mode with two data words
    - Standard Standby Timer
    - IORDY Supported
    - IORDY can be disabled
    - S.M.A.R.T. (Self-Monitoring, Analysis,  Reporting Technology):
      An open standard  for  developing  disk  drives  and  software
      systems that automatically monitor a disk drive's  health  and
      report potential  problems  so  that  you  to  take  proactive
      actions to prevent impending disk crashes
    - S.M.A.R.T. Self-test
    - S.M.A.R.T. Error Logging
    - Security Mode
    - Removable Media
    - Power Management
    - PACKET Command
    - Write Cache
    - Look-ahead
    - Release Interrupt
    - Service Interrupt
    - Device Reset Command
    - Host Protected Area
    - Write Verify Command
    - Write Buffer Command
    - Read Buffer Command
    - NOP Command
    - Identify Device DMA Command
    - Download Microcode Command
    - Read/Write DMA Queued
    - CFA Feature
    - Advanced Power Management
    - Removable Media Status
    - Power-up in Standby
    - Set Features Req. to Spinup
    - Set Max Security Extension
    - Automatic Acoustic Management: Optimizing  the  noise-to-speed
      ratio of your hard disk
    - 48-bit Address: Support of the 48-bit LBA address
    - Device Configuration Overlay
    - Flush Cache Command
    - Flush Cache Ext Command
    - Media Serial Number
    - Media Card Pass Through
    - Streaming Feature
    - General Purpose Logging
    - Write DMA/Multiple FUA EXT
    - Write DMA Queued FUA EXT
    - World Wide Name
D
  Starting from S.M.A.R.T., every item can be enabled or disabled.
'Q
 ATAPI Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀
  ATAPI Model: Vendor and name of the ATAPI device.
t
  ATAPI Type: Device type (HDD,  CD-ROM,  CD-RW,   DVD-ROM  scanner,
  streamer, etc.) installed on the EIDE port.
 
  ATAPI Name: Full ATAPI name.
@
  Vendor Specific: Any text information provide by the vendor.
S
  Read Speed: Maximum read speed of your CD device (current value in
  brackets).
V
  Write Speed: Maximum write speed of your CD device (current  value
  in brackets).
'
  Buffer Size: CD device buffer size.
3
  Loading Mechanism: Disk loading mechanism type.
8
  Rotation Control: Rotation control method (CLV/CAV).
O
  Read Retry Count: Number of read  retries  if  the  first  attempt
  fails.
v
  Write Retry Count: Number of write retries if  the  first  attempt
  fails (is important only for rewritable CDs).
\
  Compatibility:  Compatibility  of  the  device  with  the  certain
  ATA/ATAPI standard.
.
  Serial Number: Unique ATAPI serial number.
G
  Controller Revision: Version number returned by the IDE-controller.
l
  Command  DRQ  Type:  Possible    values - 'Microprocessor    DRQ',
  'Interrupt DRQ', 'Accelerated DRQ'.
C
  Command Packet Size: Possible values - '12 byte' and '16 byte'.

  PIO Mode Support: PIO (Programmed Input/Output) is a way of moving
  data between device in a computer in  which  all  data  must  pass
  through the processor.  The higher the number is,  the higher  the
  data transfer rate is (For PIO mode 4 - 16.6 MBps).
w
  SW DMA Mode Support: Number of the supported single word DMA mode.
  Active: SW DMA mode currently enabled by BIOS.
|
  MW DMA Mode Support: DMA  (Direct  Memory  Access) is  a  transfer
  protocol where a peripheral device transfers information  directly
  to or from memory,  without the system processor being required to
  perform the transaction. Apart from the previous mode, single word
  DMA modes can be supplanted by multiword DMA modes. Active: MW DMA
  mode currently enabled by BIOS.
V
  UDMA  Mode  Support:  Number  of  the  UltraDMA  mode. Theoretical
  transmission speed for UltraDMA mode 2 is 33 MB/s,  mode 5  -  100
  MB/s.  Some chipsets don't support  UltraDMA  mode  (for  example,
  chipsets i430VX and lower don't support it while  i440BX  supports
  only mode 2). Active: UltraDMA mode currently enabled by BIOS.
;
  ATAPI Features:
    - DMA Transfer: Drive support of the DMA mode
    - LBA Support: LBA (Logical Block  Addressing) -  accesses  make
      through "big" logical blocks of data
    - Block Mode: Running in a block mode. This means that more than
      one sector can be transferred on each interrupt;  newer drives
      allow you to transfer as many as 16 or 32 sectors at a time
    - IORDY Support
    - IORDY may be Disabled
    - ATA Software Reset
    - Overlap Operation
    - Command Queuing
    - Interleaving DMA
  Reading Features:
    - CD-R Disk Read
    - CD-RW Disk Read
    - DVD-ROM Disk Read
    - DVD-R Disk Read
    - DVD-RAM Disk Read
    - Read Packet Using Method 2
    - Read Mode2 Form1 Sectors
    - Read Mode2 Form2 Sectors
    - Multisession Disk Read
    - READ-CD Command on AudioCD
    - Read Bar Code Capable
    - Read Lead-in (CD-Text)
  Writing Features:
    - CD-R Disk Write
    - CD-RW Disk Write
    - DVD-R Disk Write
    - DVD-RAM Disk Write
    - Test Write Mode Support
    - Buffer Under-run Free Rec.
  Other Features:
    - Audio Play Support
    - CD-DA Stream is Accurate
    - Composite Audio/Video
    - Digital Output on Port 1
    - Digital Output on Port 2
    - Support Subcode R-W
    - Support Subcode R-W D&C
    - C2 Pointers Supported
    - ISRC Supported
    - UPC Supported
'z
 SCSI Devices Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  For SCSI detection the ASPI manager for  SCSI controller should be
  loaded.
4
  Device Name: Vendor and name of the SCSI device.

  Size: Real SCSI size.
G
  Device Type: SCSI device type (HDD, CD drive, scanner, tape drive).
¥
  HDD Geometry: Heads,  Sectors,  Tracks: Logical number  of  heads,
  sectors per track and tracks.  It has nothing to do with  physical
  HDD parameters.
R
  Compatibility: Compatibility of the device with the  certain  SCSI
  standard.
-
  Serial Number: SCSI unique serial number.
7
  Controller Revision: SCSI firmware revision number.
@
  Vendor Specific: Any text information provide by the vendor.
╟
  HDD Marketing Size: The marketing size much more than  real  size.
  In  one  'computer'  megabyte  of  1048576  bytes,    but  in  one
  'marketing' (used by HDD manufacturers) of 1000000 bytes.
╣
  Buffer Size: Buffer size of the SCSI device (you shouldn't mix  it
  up with disk cache).  Part of the buffer can be  used  for  system
  purposes, and its real size can be smaller.
A
  Rotation Speed: Specifies the speed where the medium rotates.
;
  Device Temperature: Current temperature of SCSI device.
m
  Location: Device logical address (Host, Target, LUN - host number,
  device number, logical unit number).
(
  Manager ID: SCSI manager identifier.
+
  Adapter ID: SCSI controller identifier.
O
  Read Retry Count: Number of read  retries  if  the  first  attempt
  fails.
O
  Write Retry Count: Number of write retries if  the  first  attempt
  fails.
h
  Ext. Self-Test Time: Time in seconds that the device  requires  to
  complete an extended self-test.
 
  Bus Width: Device bus width.
&
  Addres Width: Device addres width.
i
  SCSI Device Features:
    - Removable Medium
    - Read Cache
    - Write Cache
    - Read Reallocate: Automatic reallocation of  defective  logical
      blocks during read operations.
    - Write Reallocate: Automatic reallocation of defective  logical
      blocks during write operations.
    - Terminate I/O Process
    - Normal ACA
    - Hierarchical Support
    - Embedded Array Controller
    - Protection Information
    - Enclosure Services
    - Multi-Ported Device
    - Medium Changer
    - Relative Addressing
    - Synchronous Transfer
    - Linked Commands
    - Soft Reset
    - Quick Arbitration
':
 PnP Info ▄
  ▀▀▀▀▀▀▀▀▀
  Information about PnP devices.
8
    PnP Devices Info
    ISA/PnP Info
    LPT/PnP Info
 @!U"f'J
 PnP Devices Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  PnP Version: PnP BIOS version.
8
  Number of PnP Devices: Number of system PnP devices.
<
  Hereinafter there is the list of all system PnP devices.
3
  Device Number: Number of the system PnP device.
4
  Node Size: Memory size provided for PnP devices.
5
  PnP Device ID: EISA-style device ID and its name.
4
  Base Type: Base type of the device and its name.
(
  SubType: Device subtype of the type.
ƒ
  System  IRQ:  Enabled  system  IRQ  number  and  type.    Possible
  values - 'High True Edge',  'Low True Edge',  'High  True  Level',
  'Low True Level'.
¥
  DMA Channel: DMA channel number and type.  Possible values - 'Type
  8237',  'Type A',  'Type B',  'Type F',  capacity - 8/16 bit,  Bus
  Master support.
&
  I/O Port: Range of used I/O ports.
å
  Memory Address: Memory addresses range and  its  type.    Possible
  values - ROM, RAM, capacity - 8/16/32 bit, Cacheable, Shadow.
'¢
 ISA/PnP Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀
  Provides information for all ISA/PnP devices.   The  program  will
  detect them even if your BIOS doesn't support PnP.
C
  Number of ISA/PnP Cards: Number of the installed ISA/PnP cards.
4
  Read Port: Number of the ISA/PnP read data port.
3
  Card Number: ISA/PnP card number in the system.
=
  ISA Device ID: EISA-style ISA/PnP device ID and its name.
-
  Serial Number: Unique card serial number.
=
  PnP Version: Number of PnP version supported by the card.
:
  ANSI String: Internal text string of the ISA/PnP card.
j
  Every ISA/PnP card has one or more logical devices.  The following
  is the list of all these devices.
=
  Logical DevID: EISA-style logical device ID and its name.
@
  Status: Current status of logical device - enabled/disabled.

  Compatible ID: Compatible device ID.  If  there  are  no  original
  drivers you can use drivers of this compatible device.
:
  ANSI String: Internal text string of the ISA/PnP card.
8
  I/O Port: Number of the I/O port used by the device.
¥
  System IRQ: Number and type of the system IRQ used by the  device.
  Possible values: High True Edge,  Low True Edge,  High True Level,
  Low True Level.
l
  DMA Channel: Number and capacity of the DMA channel  used  by  the
  device. Possible values - 8/16 bit.
^
  Memory Address: Memory addresses and  their  discharge.   Possible
  values - 8/16/32 bit.
'á
 LPT/PnP Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀
  Provides information for all LPT/PnP devices (printers, scanners).
  LPT device should be compliant with IEEE-1284 standard.
5
  Manufacturer: Manufacturer of the LPT/PnP device.

  Model: Device model.
t
  Class: Device class. Possible values:  PRINTER,  MODEM,  NET, HDC,
  PCMCIA, MEDIA, FDC, PORTS, SCANNER, DIGCAM.
$
  Description: Device description.
(
  Serial number: Device serial number.
"
  Memory: Installed memory size.

  Version: Device Version.

  Revision: Device Revision.
5
  Command Set: Command set supported by the device.
-
  IO Preferences: Supported IO preferences.

  Compatible ID: Compatible device ID.  If  there  are  no  original
  drivers you can use drivers of this compatible device.
)
  Status: Current status of the device.
1
  Other: Other unique ID of this device/vendor.
C
  Note: Fields are optional except Manufacturer, Model and Class.
'e
 DMI/SMBIOS Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  This window is available on system with DMI/SMBIOS support.
<
  DMI/SMBIOS Version: Version of DMI/SMBIOS specification.
?
  Number of Structures: Total number of DMI/SMBIOS structure.
`
  Structure Address: Physical  starting  address  of  the  read-only
  SMBIOS structure table.
6
  OEM Strings: Free form strings defined by the OEM.
b
  Other Structures: List of DMI/SMBIOS structures (name, code),  not
  supported by the program.
'P
 DMI Slots Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Contains information about system slots.
5
  Slot Type: System slot type (AGP, PCI, ISA, etc.)
6
  Current Usage: Current usage - available / in use.
(
  Data Bus Width: Slot data bus width.
,
  Slot Designation: Reference designation.
9
  Slot Length: Slot length - sort length / long length.
'U
 DMI Ports Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Int. Connector Type: Internal connector type.
1
  Ext. Connector Type: External connector type.
2
  Port Type: Describes the function of the port.
^
  Int. Designator: Internal reference designator,  i.e.  internal to
  the system enclosure.
Z
  Ext. Designator: External reference designation  external  to  the
  system enclosure.
',
 Drives Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀
  Provide information on every known BIOS system drives.  Alphabetic
  code of drives,  their capacity,  number of cylinders,  heads  and
  sectors per track are displayed.  If CD-ROM  is  installed,    the
  program will detect its alphabetic code and MSCDEX version.
╖
  INT 13h Extension: If this extension is not supported  BIOS  won't
  identify the correct disk size over 8 GB.  Windows  emulates  this
  extension and always returns 1.x version.
'æ
 Monitor Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀
  This window is available only on  computers  with  relatively  new
  monitors and video cards supporting the VBE/DC specification.  All
  recent cards support VBE/DC (some  video  cards  have  Plug-n-Play
  ON/OFF modes - it should be ON).  It  is  necessary  to  have  new
  Plug-n-Play cord connecting videocard  and  monitor  in  order  to
  detect monitor type.
(
  Monitor Vendor: Monitor vendor name.
&
  Monitor Model: Monitor model name.
$
  Viewable Diagonal: Real (visible) diagonal monitor size. This size
  is less than the size of tube indicated on monitor itself  and  in
  price-lists.  Real diagonal  size  of  14-inch  monitors  is  12.7
  inches,  of 15-inch monitors - 13.8 inches,  of 17-inch monitors -
  15.7 inches.
0
  Serial Number: Monitor unique serial number.
;
  Manufacture: Month and year of the monitor manufacture.
!
  EDID Version: VBE/DC version.
:
  Horizontal Size: Real (visible) horizontal image size.
6
  Vertical Size: Real (visible) vertical image size.
T
  Gamma Factor: Standard used to correct the  non-linear  brightness
  distortion.
2
  Display Type: Display type - color/monochrome.
6
  Input Signal: Input signal type - analogue/digital
B
  Internal Vendor, Internal Model, Internal Number (optionally).
=
  Vertical Frequency: Vertical frequency rate (optionally).
=
  Horizontal Freq.: Horizontal frequency rate (optionally).
▒
  DPMS Features: DPMS features supported by the monitor:
    - Active Off - active off mode.  Energy consumption is less than
      5 Wt, return to normal mode within 8-20 seconds
    - Suspend - suspended mode.  Energy consumption is less than  30
      Wt, return to normal mode within 4 seconds
    - Standby - standby mode. Energy consumption is less than 80% of
      normal consumption, return to normal mode within 1 second.
ß
  Supported Modes: List of supported modes (horizontal and  vertical
  size in pixels) and supported refresh frequency (in Hz). Monitor's
  refresh  rate  can  be  less  than  indicated  in   the    monitor
  documentation.
'₧
 Video Info ▄
  ▀▀▀▀▀▀▀▀▀▀▀
  If your videocard doesn't support VESA standard,   only  VESA  OEM
  String and Video Memory will be available in this window.
B
  Video Chip Vendor: Is identified only for PCI/AGP video cards.
q
  Video  Chip:  Main  microchip  of  the  graphic  controller.    Is
  identified only for PCI/AGP video cards.
4
  Subsys Vendor: Videocard series name (optional).
,
  Subsystem ID: Videocard name (optional).
D
  AGP Version: Version of the AGP bus supported by the video card.
i
  AGP Speed: Speed of the AGP  bus  supported  by  the  video  card.
  'Selected' is the current speed.
*
  VESA Version: Version 1.2 is standard for all modern video  cards.
  Most new video  cards  are  supplied  with  BIOS  supporting  VESA
  2.0/3.0,  it is possible to load program driver  for  other  video
  cards (for example,  UniVBE v.5.3).  Driver UniVBE v.6.0  supports
  VESA 3.0 standard.
ú
  VESA OEM String: Video BIOS ID identified by any video  card  with
  VESA-support.  If VESA is not  supported,    the  program  detects
  EGA/VGA adapter type.
⌐
  Video Memory: Video memory size returned by  VESA  BIOS  function.
  Some graphics accelerators return not total video memory size  but
  size identified in 2D mode.
,
  OEM software version: For VESA 2.0 only.
/
  Vendor Name: VBE vendor. For VESA 2.0 only.
$
  Product Name: For VESA 2.0 only.
#
  VESA Power Management Version:.
j
  Supported Features:
    - Standby
    - Suspend
    - Off
    - Reduced On
  (See Window Monitor Info)

  Supported VESA Modes: Table with all  supported  VESA  BIOS  modes
  containing mode number,  text or graphic  mode,    horizontal  and
  vertical resolution,  colors,  pixel per bit number and  supported
  features.  VESA 1.2 modes are compatible with  traditional  banked
  only modes.  VESA 2.0 modes support banked+linear modes.  If  your
  video memory is too small to support one of mode  will  be  marked
  Not Supported in the Features section.  Program displays  list  of
  additional S3 video modes for S3 video cards.
'╙'8
 Exit to DOS ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀
  Exit. Hot key - Alt-X.
'$
 Report ▄
  ▀▀▀▀▀▀▀
  Report menu.
:
    Full Report
    Summary Report
    INI Format Report
+*,:-M'#
 Full Report ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀
  To create a file report,  choose the Full Report item (hot key F2)
  in the Report menu.  You can type the report name and comments  in
  the appeared window. By default program will create file astra.rpt
  with the content of the ASTRA's all information  windows  will  be
  created in its catalogue.  If your computer has  a  network  name,
  file report will be named after it (maximum 8 symbols).   Creation
  of summary (Report:Summary Report) and INI (Report:INI Format Report
  ) reports is also available.
,╙-≤'G
 Summary Report ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Creation of the summary report.
'π
 INI Format Report ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  To create  a file  report  in INI format,  choose  the  INI Format
  Report item in the  Report menu or use /RJ command  line key. This
  file can be imported to Hardware Inspector.
/
                          Hardware Inspectror
  Hardware Inspector is the application for automated hardware asset
  tracking and inventory  management  of  hardware.    The  Hardware
  Inspector is unique because  it  keeps  separate  records  of  the
  devices,  and not just configuration settings  of  each  computer.
  Each device is assigned a passport,  and  the  program  keeps  the
  history of its transitions between workplaces and registers  their
  maintenance   information.        See    more    information    on
  http://www.hwinspector.com
'%
 Help ▄
  ▀▀▀▀▀
  Help system menu.
'{
 Contents ▄
  ▀▀▀▀▀▀▀▀▀
  Program provides  you  with  a  hypertext  context-sensitive  help
  facility.  You can choose an item from the Help:Contents  menu  or
  use the hot key F1.  English is the help system default  language.
  If you wish to change it,  choose an item Help:Language.   In  the
  appea red window choose the language you need  and  click  the  OK
  button. You can navigate in the help system using cursor keys or a
  mouse on the scrolling bar. You can go to hypertext links by press
  TAB (forward) or Shift-TAB (back)  and  Enter  (go  to  the  link)
  buttons. To quit the help system, press the ESC button.
'╘
 Language ▄
  ▀▀▀▀▀▀▀▀▀
  English is the help system default language. If you wish to change
  it,  choose an item Help:Language. In the appear red window choose
  the language you need and click the OK button.
'ª
 About ▄
  ▀▀▀▀▀▀
  This program performs computer configuration analysis and provides
  detailed information on your computer  hardware  and  its  working
  modes.
'x
 The Demo Concept ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  ASTRA is distributed as feature-limited demo version. You can  use
  it for free during a 14-day trial period.  After the trial time is
  expired,  you must either register the program or delete  it  from
  all your  storage  devices.    You  can  find  the  more  detailed
  information in the license agreement (file license.txt).
,
                           How To Register
Q
  Please visit http://www.sysinfolab.com/register.htm to  order  the
  program.
k
  Please,  contact us to get additional information  about  ordering
  our software: sales@sysinfolab.com
+
  See file register.txt for more details.
0
                         Registration Benefits
r
  1. You'll be able to create a FILE REPORT.
  2. You'll be able to run program in BATCH MODE.
  3. You'll be able to use MACROS in BATCH MODE.
  4. You'll be able to create a FILE REPORT in INI format.
  5. The program will detect the SERIAL NUMBER of DEVICES.
  6. You'll be  able  to  import  reports  into  HARDWARE  INVENTORY
     MANAGEMENT SOFTWARE - Hardware Inspector.
  7. You'll see no more nag screens.
  8. You'll get FREE technical support.
  9. You'll get FREE UPDATES  DURING  ONE  YEAR  from  the  date  of
     purchase and 50% DISCOUNT after that.
  10.You can order ASTRA32 for Windows with 30% DISCOUNT.
'-2	

 !"#$%&'()*+,-./012          e:$&₧&√=MA=EJH▒H▄OV \à]i╗iCquwdx╪ìL£ªÑ3ª√⌐Ö»S│C╡ú╢(╕║Y┬ê╩╔╩B╦x═╚═µ╨╤ÿ╙u╘$╒                    